// Status=review
- Click the *Stop* button on the main window to halt any data acquisition.  
- Select JT9 from the *Mode* menu and *Deepest* from the *Decode* menu.
- Set the audio Tx and Rx frequencies to 1224 Hz.
//Maybe  show small screen shots here?
