// Status=review

- You can control the program's font sizes by using a text editor
(e.g., Windows Notepad or similar) to create a one-line file named
+fonts.txt+ in the _WSJT-X_ installation directory. Enter a single
line of text with four numbers separated by spaces.  The first two
numbers control the font size (in points) and weight (on a 0 – 100
scale) of most labels on the user interface. The last two numbers
control size and weight of text in the *Band Activity* and *Rx
Frequency* windows.

- By default the four numbers are ``8 50 10 50''. If you need larger
fonts in the user interface and bold text in the decode windows, try
``10 50 12 100'' (without the quotes).

