// Status=review

The Band Settings tab allows you to define the default frequency and
enter a brief description of your antenna for each amateur band.  The
antenna information will be included with reception reports to
{pskreporter}, if enabled.

[[FigBandSettings]]
image::images/band-settings.png[align="left"]
