// Status=review

- Click the *Stop* button on the main window to halt any data acquisition.  
- Select *JT9* from the *Mode* menu and *Deepest* from the *Decode* menu.
- Set the audio frequencies to *Tx 1224 Hz* and *Rx 1224 Hz*.

