=== New in Version 1.7

For quick reference, here's a short list of features and capabilities
added to _WSJT-X_ since Version 1.6.0:

- New modes: ISCAT, MSK144, QRA64.

- Newly implemented submodes of existing modes: JT65B-C, JT9B-H (wide
and fast).

- New Franke-Taylor decoder replaces the Koetter-Vardy decoder in
JT65; the separate program `kvasd[.exe]` is no longer used.

- Improvements to the JT4, JT9, and JT65 decoders.

- Multi-pass decoding for JT65 and WSPR.

- Improved convenience features for EME Doppler tracking.

- Multiple program configurations can be saved and restored.

- A new sample-file download facility.

- A number of corrections to the Hamlib library, fixing balky
rig-control features.  
