// Status=review

- *Bins/Pixel* = 4
- *JT65 .... JT9* = 2500
- *Start* = 200 Hz
- *N Avg* = 5
- *Zero* = 0
- *Gain* = 0
- *Palette* = Digipan
- *Flatten* = checked
- Select *Cumulative* for data display.

- Use the mouse to adjust the width of the *Wide Graph* so that its
upper frequency limit is about 2400 Hz.
