// Status=review

- *Bins/Pixel* = 4
- *Start* = 200 Hz
- *N Avg* = 5
- *Palette* = Digipan
- *Flatten* = checked
- Select *Cumulative* for data display
- *Gain* and *Zero* sliders for waterfall and spectrum set near midscale
- *Spec* = 25%

- Use the mouse to adjust the width of the *Wide Graph* so that its
upper frequency limit is about 2400 Hz.
