// Status=review
:adat: link:rig-config-adat.html[ ADAT]
:alinco: link:rig-config-alinco.html[ Alinco ]
:aor: link:rig-config-aor.html[ AOR ]
:drake: link:rig-config-drake.html[ Drake ]
:electro: link:rig-config-electro.html[ ElectroCraft ]
:flexrad: link:rig-config-flexrad.html[ Flex Radio ]
:kenwood: link:rig-config-kenwood.html[ Kenwood ]
:icom: link:rig-config-icom.html[ Icom ]
:rig_template: link:rig-config-template.html[Template]
:softrock: link:rig-config-softrock.html[ Soft Rock ]
:tentec: link:rig-config-tentec.html[ Ten Tec ]
:yaesu: link:rig-config-yaesu.html[Yaesu]

Some rigs work with DTR, RTS, Polling, CAT, and PTT while others do
not. The number of possible combinations is virtually endless.  The
purpose of this section is to provide configuration information for
specific rig models, e.g. Icom 756 Pro-III, Kenwood TS-2000, Yaesu
FT-1000MP, Flex-5000, etc. This is a work-in-progress, and some rigs
may never be covered.

TIP: If you have configuration data for a rig that is not listed, or
comments about a particular rig configuration, please use the
{rig_template} and send it to {devmail}.

.Select Manufacturer
[align="center",valign="middle",halign="center"]
|========
|{adat}|{aor}|{alinco}|{drake}|{electro}
|{flexrad}|{kenwood}|{icom}|{softrock}|{tentec}
|{yaesu}|{rig_template}|||
|========

